20040514(v6) RASNIK and Temp vs Time

9 9.25 9.5

9 9.5

Δ=0-6 μm

Xras(mm)

9 9.25 9.5

9 9.5

Yras(mm)

9 9.25 9.5

9 9.5

Zras (mm)

9 9.25 9.5

9 9.5 rotZ (mrad)

9 9.25 9.5

9 9.5

Xplate

time

ΔTemperature

9 9.25 9.5

9 9.5

Δ=6-10 μm

9 9.25 9.5

9 9.5

Yras(mm)

9 9.25 9.5

9 9.5

Zras (mm)

9 9.25 9.5

9 9.5 rotZ (mrad)

9 9.25 9.5

9 9.5

Jig

time

ΔTemperature

9 9.25 9.5

9 9.5

Δ=10+ μm

9 9.25 9.5

9 9.5

Yras(mm)

9 9.25 9.5

9 9.5

Zras (mm)

9 9.25 9.5

9 9.5 rotZ (mrad)

9 9.25 9.5

9 9.5

Granite

time

ΔTemperature

9 9.25 9.5

9 9.5

9 9.25 9.5

9 9.5

Yras(mm)

9 9.25 9.5

9 9.5

Zras (mm)

9 9.25 9.5

9 9.5 rotZ (mrad)

9 9.25 9.5

9 9.5 time

ΔTemperature

20040514(v6) RASNIK and Temp vs Time

9 9.25 9.5

9 9.5

Δ=0-6 μm

Xras(mm)

9 9.25 9.5

9 9.5

Yras(mm)

9 9.25 9.5

9 9.5

Zras (mm)

9 9.25 9.5

9 9.5 rotZ (mrad)

9 9.25 9.5

9 9.5

Xplate

time

ΔTemperature

9 9.25 9.5

9 9.5

Δ=6-10 μm

9 9.25 9.5

9 9.5

Yras(mm)

9 9.25 9.5

9 9.5

Zras (mm)

9 9.25 9.5

9 9.5 rotZ (mrad)

9 9.25 9.5

9 9.5

Jig

time

ΔTemperature

9 9.25 9.5

9 9.5

Δ=10+ μm

9 9.25 9.5

9 9.5

Yras(mm)

9 9.25 9.5

9 9.5

Zras (mm)

9 9.25 9.5

9 9.5 rotZ (mrad)

9 9.25 9.5

9 9.5

Granite

time

ΔTemperature

9 9.25 9.5

9 9.5

9 9.25 9.5

9 9.5

Yras(mm)

9 9.25 9.5

9 9.5

Zras (mm)

9 9.25 9.5

9 9.5 rotZ (mrad)

9 9.25 9.5

9 9.5 time

ΔTemperature

20040514(v6) RASNIK and Temp vs Time

67 68

9 9.5

Δ=0-6 μm

Xras(mm)

9 9.5 10

9 9.5

Yras(mm)

0 50

9 9.5

Zras (mm)

2

2.5

9 9.5 rotZ (mrad)

0 20 40

9 9.5

Xplate

time

ΔTemperature

67 68

9 9.5

Δ=6-10 μm

9 9.5 10

9 9.5

Yras(mm)

0 50

9 9.5

Zras (mm)

2

2.5

9 9.5 rotZ (mrad)

0 20 40

9 9.5 time

ΔTemperature

67 68

9 9.5

Δ=10+ μm

9 9.5 10

9 9.5

Yras(mm)

0 50

9 9.5

Zras (mm)

2

2.5

9 9.5 rotZ (mrad)

0 20 40

9 9.5 time

ΔTemperature

67 68

9 9.5

9 9.5 10

9 9.5

Yras(mm)

0 50

9 9.5

Zras (mm)

2

2.5

9 9.5 rotZ (mrad)

0 20 40

9 9.5 time

ΔTemperature