-0.01 0 0.01

10 20

Δ=0-6 μm

Xras(mm)

0 0.02

0.04

10 20

Yras(mm)

-1 0 1

10 20

Zras (mm)

0

0.2

10 20 rotZ (mrad)

-0.6

-0.4

-0.2

10 20

Xplate

time

ΔTemperature

-0.01 0 0.01

10 20

Δ=6-10 μm

0 0.02

0.04

10 20

Yras(mm)

-1 0 1

10 20

Zras (mm)

0

0.2

10 20 rotZ (mrad)

-0.6

-0.4

-0.2

10 20

Jig

time

ΔTemperature

-0.01 0 0.01

10 20

Δ=10+ μm

0 0.02

0.04

10 20

Yras(mm)

-1 0 1

10 20

Zras (mm)

0

0.2

10 20 rotZ (mrad)

-0.6

-0.4

-0.2

10 20

Granite

time

ΔTemperature

-0.01 0 0.01

10 20

0 0.02

0.04

10 20

Yras(mm)

-1 0 1

10 20

Zras (mm)

0

0.2

10 20 rotZ (mrad)

-0.6

-0.4

-0.2

10 20 time

ΔTemperature

0 0.02

10 20

Δ=0-6 μm

Xras(mm)

0.05

0.075

10 20

Yras(mm)

-0.05 0

10 20

Zras (mm)

-0.2 0 0.2

10 20 rotZ (mrad)

0 20 40

10 20 time

ΔTemperature

0 0.02

10 20

Δ=6-10 μm

0.05

0.075

10 20

Yras(mm)

-0.05 0

10 20

Zras (mm)

-0.2 0 0.2

10 20 rotZ (mrad)

0 20 40

10 20 time

ΔTemperature

0 0.02

10 20

Δ=10+ μm

0.05

0.075

10 20

Yras(mm)

-0.05 0

10 20

Zras (mm)

-0.2 0 0.2

10 20 rotZ (mrad)

0 20 40

10 20 time

ΔTemperature

0 0.02

10 20

0.05

0.075

10 20

Yras(mm)

-0.05 0

10 20

Zras (mm)

-0.2 0 0.2

10 20 rotZ (mrad)

0 20 40

10 20 time

ΔTemperature

0.02

0.04

10 20

Δ=0-6 μm

Xras(mm)

-0.1 0 0.1 0.2

10 20

Yras(mm)

-0.02 0 0.02

10 20

Zras (mm)

-0.4

-0.2 0 0.2

10 20 rotZ (mrad)

0 20 40

10 20 time

ΔTemperature

0.02

0.04

10 20

Δ=6-10 μm

-0.1 0 0.1 0.2

10 20

Yras(mm)

-0.02 0 0.02

10 20

Zras (mm)

-0.4

-0.2 0 0.2

10 20 rotZ (mrad)

0 20 40

10 20 time

ΔTemperature

0.02

0.04

10 20

Δ=10+ μm

-0.1 0 0.1 0.2

10 20

Yras(mm)

-0.02 0 0.02

10 20

Zras (mm)

-0.4

-0.2 0 0.2

10 20 rotZ (mrad)

0 20 40

10 20 time

ΔTemperature

0.02

0.04

10 20

-0.1 0 0.1 0.2

10 20

Yras(mm)

-0.02 0 0.02

10 20

Zras (mm)

-0.4

-0.2 0 0.2

10 20 rotZ (mrad)

0 20 40

10 20 time

ΔTemperature