20011212(v6) RASNIK and Temp vs Time

18.6

18.8 19

14.6 14.7

Δ=0-6 μm

Xras(mm)

0 0.2 0.4

14.6 14.7

Yras(mm)

-0.05

-0.025 0

14.6 14.7

Zras (mm)

-4 -3.95

14.6 14.7 rotZ (mrad)

0 20 40

14.6 14.7

time

ΔTemperature

18.6

18.8 19

14.6 14.7

Δ=6-10 μm

0 0.2 0.4

14.6 14.7

Yras(mm)

-0.05

-0.025 0

14.6 14.7

Zras (mm)

-4 -3.95

14.6 14.7 rotZ (mrad)

0 20 40

14.6 14.7 time

ΔTemperature

18.6

18.8 19

14.6 14.7

Δ=10+ μm

0 0.2 0.4

14.6 14.7

Yras(mm)

-0.05

-0.025 0

14.6 14.7

Zras (mm)

-4 -3.95

14.6 14.7 rotZ (mrad)

0 20 40

14.6 14.7 time

ΔTemperature

18.6

18.8 19

14.6 14.7

0 0.2 0.4

14.6 14.7

Yras(mm)

-0.05

-0.025 0

14.6 14.7

Zras (mm)

-4 -3.95

14.6 14.7 rotZ (mrad)

0 20 40

14.6 14.7 time

ΔTemperature