-0.002 0

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0.008

0.009

0.01

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

204.96

204.98

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

0 0.025

0.05

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

-0.5 0

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Xplate Jig Granite

time

ΔTemperature

-0.006

-0.004

-0.002

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0.006

0.007

0.008

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

203.54

203.56

203.58

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

-0.05 0 0.05

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

-0.5 0

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Xplate Jig Granite

time

ΔTemperature

-0.002

-0.001 0

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0.008

0.009

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

102.185

102.19

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

-0.225

-0.2

-0.175

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

-0.4

-0.2 0

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Xplate Jig Granite

time

ΔTemperature

-0.012

-0.01

-0.008

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0.72

0.773

0.827

0.88 x 10^{-2}

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

105.21

105.22

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

-0.1

-0.05

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

-0.4

-0.2 0

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Xplate Jig Granite

time

ΔTemperature

0.01

0.02

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0.05

0.06

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

115.12

115.14

115.16

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

-0.1 0 0.1

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

0 20 40

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35time

ΔTemperature

0 0.005

0.01

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0.04

0.05

0.06

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

114.9 115 115.1

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

-0.4

-0.2 0

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

0 20 40

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35time

ΔTemperature

0.01

0.015

0.02

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0.05

0.06

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

115.5

115.55

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

-0.1 0 0.1 0.2

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

0 20 40

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35time

ΔTemperature

0

0.01

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0 0.02

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

114.6

114.8 115

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

-0.2 0 0.2

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

0 20 40

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35time

ΔTemperature

0.015

0.02

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

-0.005

-0.0025 0

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

113.56

113.58

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

0.1

0.2

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

0 20 40

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35time

ΔTemperature

0

0.01

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0 0.2 0.4 0.6

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Yras(mm)

113.67

113.68

113.69

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35

Zras (mm)

0 0.1 0.2

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35 rotZ (mrad)

0 20 40

10 12.5 15 17.5 20 22.5 25 27.5 30 32.5 35time

ΔTemperature

20030523(v6) RASNIK and Temp vs Time

-0.01

0

10 22.5 35

Δ=0-6 μm

Xras(mm)

0.006

0.008

0.01

10 22.5 35

Yras(mm)

0 0.02

0.04

10 22.5 35

Zras (mm)

-0.2

0

10 22.5 35 rotZ (mrad)

-0.6

-0.4

-0.2

10 22.5 35

Xplate

time

ΔTemperature

-0.01

0

10 22.5 35

Δ=6-10 μm

0.006

0.008

0.01

10 22.5 35

Yras(mm)

0 0.02

0.04

10 22.5 35

Zras (mm)

-0.2

0

10 22.5 35 rotZ (mrad)

-0.6

-0.4

-0.2

10 22.5 35

Jig

time

ΔTemperature

-0.01

0

10 22.5 35

Δ=10+ μm

0.006

0.008

0.01

10 22.5 35

Yras(mm)

0 0.02

0.04

10 22.5 35

Zras (mm)

-0.2

0

10 22.5 35 rotZ (mrad)

-0.6

-0.4

-0.2

10 22.5 35

Granite

time

ΔTemperature

-0.01

0

10 22.5 35

0.006

0.008

0.01

10 22.5 35

Yras(mm)

0 0.02

0.04

10 22.5 35

Zras (mm)

-0.2

0

10 22.5 35 rotZ (mrad)

-0.6

-0.4

-0.2

10 22.5 35 time

ΔTemperature

0

20

10 22.5 35

Δ=0-6 μm

Xras(mm)

0

0.5

10 22.5 35

Yras(mm)

0 0.2 0.4

10 22.5 35

Zras (mm)

-0.5

0

10 22.5 35 rotZ (mrad)

0 20 40

10 22.5 35 time

ΔTemperature

0

20

10 22.5 35

Δ=6-10 μm

0

0.5

10 22.5 35

Yras(mm)

0 0.2 0.4

10 22.5 35

Zras (mm)

-0.5

0

10 22.5 35 rotZ (mrad)

0 20 40

10 22.5 35 time

ΔTemperature

0

20

10 22.5 35

Δ=10+ μm

0

0.5

10 22.5 35

Yras(mm)

0 0.2 0.4

10 22.5 35

Zras (mm)

-0.5

0

10 22.5 35 rotZ (mrad)

0 20 40

10 22.5 35 time

ΔTemperature

0

20

10 22.5 35

0

0.5

10 22.5 35

Yras(mm)

0 0.2 0.4

10 22.5 35

Zras (mm)

-0.5

0

10 22.5 35 rotZ (mrad)

0 20 40

10 22.5 35 time

ΔTemperature

20030523(v6) RASNIK and Temp vs Time

0.01

0.02

10 22.5 35

Δ=0-6 μm

Xras(mm)

0 0.05

10 22.5 35

Yras(mm)

-0.02 0

10 22.5 35

Zras (mm)

0 0.1 0.2

10 22.5 35 rotZ (mrad)

0 20 40

10 22.5 35 time

ΔTemperature

0.01

0.02

10 22.5 35

Δ=6-10 μm

0 0.05

10 22.5 35

Yras(mm)

-0.02 0

10 22.5 35

Zras (mm)

0 0.1 0.2

10 22.5 35 rotZ (mrad)

0 20 40

10 22.5 35 time

ΔTemperature

0.01

0.02

10 22.5 35

Δ=10+ μm

0 0.05

10 22.5 35

Yras(mm)

-0.02 0

10 22.5 35

Zras (mm)

0 0.1 0.2

10 22.5 35 rotZ (mrad)

0 20 40

10 22.5 35 time

ΔTemperature

0.01

0.02

10 22.5 35

0 0.05

10 22.5 35

Yras(mm)

-0.02 0

10 22.5 35

Zras (mm)

0 0.1 0.2

10 22.5 35 rotZ (mrad)

0 20 40

10 22.5 35 time

ΔTemperature