-15.05

-15

11.4 12.1 12.8

Δ=0-6 μm

Xras(mm)

-20 0 20

11.4 12.1 12.8

Yras(mm)

1775

1800

1825

11.4 12.1 12.8

1000/scale

-0.2

0

11.4 12.1 12.8 rotZ (mrad)

0 20 40

11.4 12.1 12.8

Xplate

time

ΔTemperature

-15.05

-15

11.4 12.1 12.8

Δ=6-10 μm

-20 0 20

11.4 12.1 12.8

Yras(mm)

1775

1800

1825

11.4 12.1 12.8

1000/scale

-0.2

0

11.4 12.1 12.8 rotZ (mrad)

0 20 40

11.4 12.1 12.8

Jig

time

ΔTemperature

-15.05

-15

11.4 12.1 12.8

Δ=10+ μm

-20 0 20

11.4 12.1 12.8

Yras(mm)

1775

1800

1825

11.4 12.1 12.8

1000/scale

-0.2

0

11.4 12.1 12.8 rotZ (mrad)

0 20 40

11.4 12.1 12.8

Granite

time

ΔTemperature

-15.05

-15

11.4 12.1 12.8

-20 0 20

11.4 12.1 12.8

Yras(mm)

1775

1800

1825

11.4 12.1 12.8

1000/scale

-0.2

0

11.4 12.1 12.8 rotZ (mrad)

0 20 40

11.4 12.1 12.8 time

ΔTemperature

-15.05

-15

11.5 12

Δ=0-6 μm

Xras(mm)

-20 0 20

11.5 12

Yras(mm)

1775

1780

11.5 12

1000/scale

-0.2 0 0.2

11.5 12 rotZ (mrad)

0 20 40

11.5 12

Xplate

time

ΔTemperature

-15.05

-15

11.5 12

Δ=6-10 μm

-20 0 20

11.5 12

Yras(mm)

1775

1780

11.5 12

1000/scale

-0.2 0 0.2

11.5 12 rotZ (mrad)

0 20 40

11.5 12

Jig

time

ΔTemperature

-15.05

-15

11.5 12

Δ=10+ μm

-20 0 20

11.5 12

Yras(mm)

1775

1780

11.5 12

1000/scale

-0.2 0 0.2

11.5 12 rotZ (mrad)

0 20 40

11.5 12

Granite

time

ΔTemperature

-15.05

-15

11.5 12

-20 0 20

11.5 12

Yras(mm)

1775

1780

11.5 12

1000/scale

-0.2 0 0.2

11.5 12 rotZ (mrad)

0 20 40

11.5 12 time

ΔTemperature

11.5

11.75 12

11.5 12

Δ=0-6 μm

Xras(mm)

11.5

11.75 12

11.5 12

Yras(mm)

11.5

11.75 12

11.5 12

1000/scale

11.5

11.75 12

11.5 12 rotZ (mrad)

11.5

11.75 12

11.5 12 time

ΔTemperature

11.5

11.75 12

11.5 12

Δ=6-10 μm

11.5

11.75 12

11.5 12

Yras(mm)

11.5

11.75 12

11.5 12

1000/scale

11.5

11.75 12

11.5 12 rotZ (mrad)

11.5

11.75 12

11.5 12 time

ΔTemperature

11.5

11.75 12

11.5 12

Δ=10+ μm

11.5

11.75 12

11.5 12

Yras(mm)

11.5

11.75 12

11.5 12

1000/scale

11.5

11.75 12

11.5 12 rotZ (mrad)

11.5

11.75 12

11.5 12 time

ΔTemperature

11.5

11.75 12

11.5 12

11.5

11.75 12

11.5 12

Yras(mm)

11.5

11.75 12

11.5 12

1000/scale

11.5

11.75 12

11.5 12 rotZ (mrad)

11.5

11.75 12

11.5 12 time

ΔTemperature

11.5

11.75 12

11.5 12

Δ=0-6 μm

Xras(mm)

11.5

11.75 12

11.5 12

Yras(mm)

11.5

11.75 12

11.5 12

1000/scale

11.5

11.75 12

11.5 12 rotZ (mrad)

11.5

11.75 12

11.5 12 time

ΔTemperature

11.5

11.75 12

11.5 12

Δ=6-10 μm

11.5

11.75 12

11.5 12

Yras(mm)

11.5

11.75 12

11.5 12

1000/scale

11.5

11.75 12

11.5 12 rotZ (mrad)

11.5

11.75 12

11.5 12 time

ΔTemperature

11.5

11.75 12

11.5 12

Δ=10+ μm

11.5

11.75 12

11.5 12

Yras(mm)

11.5

11.75 12

11.5 12

1000/scale

11.5

11.75 12

11.5 12 rotZ (mrad)

11.5

11.75 12

11.5 12 time

ΔTemperature

11.5

11.75 12

11.5 12

11.5

11.75 12

11.5 12

Yras(mm)

11.5

11.75 12

11.5 12

1000/scale

11.5

11.75 12

11.5 12 rotZ (mrad)

11.5

11.75 12

11.5 12 time

ΔTemperature