20020516(v6) RASNIK and Temp vs Time

9.1

9.2

9.1 9.2

Δ=0-6 μm

Xras(mm)

9.1

9.2

9.1 9.2

Yras(mm)

9.1

9.2

9.1 9.2

1000/scale

9.1

9.2

9.1 9.2 rotZ (mrad)

9.1

9.2

9.1 9.2

time

ΔTemperature

9.1

9.2

9.1 9.2

Δ=6-10 μm

9.1

9.2

9.1 9.2

Yras(mm)

9.1

9.2

9.1 9.2

1000/scale

9.1

9.2

9.1 9.2 rotZ (mrad)

9.1

9.2

9.1 9.2 time

ΔTemperature

9.1

9.2

9.1 9.2

Δ=10+ μm

9.1

9.2

9.1 9.2

Yras(mm)

9.1

9.2

9.1 9.2

1000/scale

9.1

9.2

9.1 9.2 rotZ (mrad)

9.1

9.2

9.1 9.2 time

ΔTemperature

9.1

9.2

9.1 9.2

9.1

9.2

9.1 9.2

Yras(mm)

9.1

9.2

9.1 9.2

1000/scale

9.1

9.2

9.1 9.2 rotZ (mrad)

9.1

9.2

9.1 9.2 time

ΔTemperature