20010830(v6) RASNIK and Temp vs Time

-0.01 0

16 20 24

Δ=0-6 μm

Xras(mm)

0 0.02

16 20 24

Yras(mm)

900 950 1000

16 20 24

1000/scale

0

0.2

16 20 24 rotZ (mrad)

-0.4

-0.35

-0.3

16 20 24

Xplate

time

ΔTemperature

-0.01 0

16 20 24

Δ=6-10 μm

0 0.02

16 20 24

Yras(mm)

900 950 1000

16 20 24

1000/scale

0

0.2

16 20 24 rotZ (mrad)

-0.4

-0.35

-0.3

16 20 24

Jig

time

ΔTemperature

-0.01 0

16 20 24

Δ=10+ μm

0 0.02

16 20 24

Yras(mm)

900 950 1000

16 20 24

1000/scale

0

0.2

16 20 24 rotZ (mrad)

-0.4

-0.35

-0.3

16 20 24

Granite

time

ΔTemperature

-0.01 0

16 20 24

0 0.02

16 20 24

Yras(mm)

900 950 1000

16 20 24

1000/scale

0

0.2

16 20 24 rotZ (mrad)

-0.4

-0.35

-0.3

16 20 24 time

ΔTemperature

20010830(v6) RASNIK and Temp vs Time

16 18.667

21.333 24

16 20 24

Δ=0-6 μm

Xras(mm)

16 18.667

21.333 24

16 20 24

Yras(mm)

16 18.667

21.333 24

16 20 24

1000/scale

16 18.667

21.333 24

16 20 24 rotZ (mrad)

16 18.667

21.333 24

16 20 24

Xplate

time

ΔTemperature

16 18.667

21.333 24

16 20 24

Δ=6-10 μm

16 18.667

21.333 24

16 20 24

Yras(mm)

16 18.667

21.333 24

16 20 24

1000/scale

16 18.667

21.333 24

16 20 24 rotZ (mrad)

16 18.667

21.333 24

16 20 24

Jig

time

ΔTemperature

16 18.667

21.333 24

16 20 24

Δ=10+ μm

16 18.667

21.333 24

16 20 24

Yras(mm)

16 18.667

21.333 24

16 20 24

1000/scale

16 18.667

21.333 24

16 20 24 rotZ (mrad)

16 18.667

21.333 24

16 20 24

Granite

time

ΔTemperature

16 18.667

21.333 24

16 20 24

16 18.667

21.333 24

16 20 24

Yras(mm)

16 18.667

21.333 24

16 20 24

1000/scale

16 18.667

21.333 24

16 20 24 rotZ (mrad)

16 18.667

21.333 24

16 20 24 time

ΔTemperature

20010830(v6) RASNIK and Temp vs Time

-0.05 0 0.05

16 20 24

Δ=0-6 μm

Xras(mm)

-0.15

-0.1

-0.05

16 20 24

Yras(mm)

1003

1004

1005

1006

16 20 24

1000/scale

0

0.5

16 20 24 rotZ (mrad)

19.93

19.985

20.039

20.094

16 20 24 time

ΔTemperature

-0.05 0 0.05

16 20 24

Δ=6-10 μm

-0.15

-0.1

-0.05

16 20 24

Yras(mm)

1003

1004

1005

1006

16 20 24

1000/scale

0

0.5

16 20 24 rotZ (mrad)

19.93

19.985

20.039

20.094

16 20 24 time

ΔTemperature

-0.05 0 0.05

16 20 24

Δ=10+ μm

-0.15

-0.1

-0.05

16 20 24

Yras(mm)

1003

1004

1005

1006

16 20 24

1000/scale

0

0.5

16 20 24 rotZ (mrad)

19.93

19.985

20.039

20.094

16 20 24 time

ΔTemperature

-0.05 0 0.05

16 20 24

-0.15

-0.1

-0.05

16 20 24

Yras(mm)

1003

1004

1005

1006

16 20 24

1000/scale

0

0.5

16 20 24 rotZ (mrad)

19.93

19.985

20.039

20.094

16 20 24 time

ΔTemperature

20010830(v6) RASNIK and Temp vs Time

-0.1

-0.05

16 20 24

Δ=0-6 μm

Xras(mm)

-0.2

0

16 20 24

Yras(mm)

985 990

16 20 24

1000/scale

-0.5 0 0.5

16 20 24 rotZ (mrad)

20 20.2

16 20 24 time

ΔTemperature

-0.1

-0.05

16 20 24

Δ=6-10 μm

-0.2

0

16 20 24

Yras(mm)

985 990

16 20 24

1000/scale

-0.5 0 0.5

16 20 24 rotZ (mrad)

20 20.2

16 20 24 time

ΔTemperature

-0.1

-0.05

16 20 24

Δ=10+ μm

-0.2

0

16 20 24

Yras(mm)

985 990

16 20 24

1000/scale

-0.5 0 0.5

16 20 24 rotZ (mrad)

20 20.2

16 20 24 time

ΔTemperature

-0.1

-0.05

16 20 24

-0.2

0

16 20 24

Yras(mm)

985 990

16 20 24

1000/scale

-0.5 0 0.5

16 20 24 rotZ (mrad)

20 20.2

16 20 24 time

ΔTemperature