20010831(v6) RASNIK and Temp vs Time

-0.01

-0.005

0 10

Δ=0-6 μm

Xras(mm)

0 0.005

0 10

Yras(mm)

900 950 1000

0 10

1000/scale

-0.1 0 0.1 0.2

0 10 rotZ (mrad)

-0.4

-0.35

-0.3

0 10

Xplate

time

ΔTemperature

-0.01

-0.005

0 10

Δ=6-10 μm

0 0.005

0 10

Yras(mm)

900 950 1000

0 10

1000/scale

-0.1 0 0.1 0.2

0 10 rotZ (mrad)

-0.4

-0.35

-0.3

0 10

Jig

time

ΔTemperature

-0.01

-0.005

0 10

Δ=10+ μm

0 0.005

0 10

Yras(mm)

900 950 1000

0 10

1000/scale

-0.1 0 0.1 0.2

0 10 rotZ (mrad)

-0.4

-0.35

-0.3

0 10

Granite

time

ΔTemperature

-0.01

-0.005

0 10

0 0.005

0 10

Yras(mm)

900 950 1000

0 10

1000/scale

-0.1 0 0.1 0.2

0 10 rotZ (mrad)

-0.4

-0.35

-0.3

0 10 time

ΔTemperature

20010831(v6) RASNIK and Temp vs Time

0 20 40 60 80 100 120 140 160 180

0 5 10 15 20 25 30

20010831 Force vs Time

0

5

10

15

20

25

30

0 2.5 5 7.5 10 12.5 15 17.5 20 22.5

NW NE ZW ZE MZW MZE MNW MNE