20000630 RASNIK and Temp vs Time

-0.004

-0.002 0

0 20 40 60 80

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

-0.002 0

0 20 40 60 80

Yras(mm)

206.72

206.773

206.827

206.88

0 20 40 60 80

Zras (mm)

1.55 1.6 1.65

0 20 40 60 80 rotZ (mrad)

0

1

0 20 40 60 80

Xplate Jig Granite

time

ΔTemperature

20000630 RASNIK and Temp vs Time

-0.005 0 0.005

0 10 20 30 40 50 60 70 80 90

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

-0.002 0 0.002

0 10 20 30 40 50 60 70 80 90

Yras(mm)

200.1

200.2

0 10 20 30 40 50 60 70 80 90

Zras (mm)

0.4 0.5

0 10 20 30 40 50 60 70 80 90 rotZ (mrad)

0

1

0 10 20 30 40 50 60 70 80 90

Xplate Jig Granite

time

ΔTemperature

20000630 RASNIK and Temp vs Time

-0.004

-0.002 0

0 20 40 60 80

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

-0.002 0

0 20 40 60 80

Yras(mm)

102.68

102.7

0 20 40 60 80

Zras (mm)

3.7 3.75 3.8

0 20 40 60 80 rotZ (mrad)

0 0.5 1

0 20 40 60 80

Xplate Jig Granite

time

ΔTemperature

20000630 RASNIK and Temp vs Time

-0.01

-0.005 0

0 20 40 60 80

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

-0.006

-0.004

0 20 40 60 80

Yras(mm)

102.9

102.92

102.94

0 20 40 60 80

Zras (mm)

3.6 3.65

0 20 40 60 80 rotZ (mrad)

0 0.5 1

0 20 40 60 80

Xplate Jig Granite

time

ΔTemperature