20000106

-0.5 0 0.5

0 5 10 15 20

(mrad)

-0.5 0 0.5

0 5 10 15 20

(mm)

-0.5 0 0.5

0 5 10 15 20

(mm)

-0.5 0 0.5

0 5 10 15 20

(mm)

0.05

0.075 0.1

0 5 10 15 20

(mm)

-0.1

-0.05 0

0 5 10 15 20

(mm)

-1 0 1

0 5 10 15 20

deg

-1 0 1

0 5 10 15 20

deg

-1 0 1

0 5 10 15 20

(mrad)

-0.5 0 0.5

0 5 10 15 20

time

(mrad)