0 0.02

0.04

0 10 20 30 40 50 60 70 80 90

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

-0.02

-0.01 0

0 10 20 30 40 50 60 70 80 90

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

-0.005 0 0.005

0 10 20 30 40 50 60 70 80 90

Δ=0-6 μm

Δ=6-10 μm

Δ=10+ μm

Xras(mm)

0 0.5 1

0 10 20 30 40 50 60 70 80 90

Xplate Granite

time

ΔTemperature