608.56 608.58 608.6 608.62608.64608.66 608.68 608.7 hx1 Entries 0 Mean x 0 Mean y 0 RMS x 0 RMS y 0

time(days) for BOL 40 x (mm)

Entries 36 Mean x 608.6 Mean y -0.02658 RMS x 0.03607 RMS y 0.002438

608.56 608.58 608.6 608.62608.64 608.66608.68 608.7 hy1 Entries 0 Mean x 0 Mean y 0 RMS x 0 RMS y 0

time(days) for BOL 40 y (mm)

Entries 36 Mean x 608.6 Mean y -0.8918 RMS x 0.03607 RMS y 0.003088

608.56 608.58 608.6 608.62608.64608.66 608.68 608.7

0

0.001

scale:(stime-1080770400)/(24*3600.) {name=="ChP0_Inp1" && anal_err==0 && glob_err==0 && rotZ<0.707 && rotZ>-0.707}hs1

Entries 0 Mean x 0 Mean y 0 RMS x 0 RMS y 0

scale:(stime-1080770400)/(24*3600.) {name=="ChP0_Inp1" && anal_err==0 && glob_err==0 && rotZ<0.707 && rotZ>-0.707}

time(days) for BOL 40 scale

0 hs1 Entries 36

Mean x 608.6 Mean y 0.0002874

RMS x 0.03607

RMS y 0.0002791