Tube comb positioning

DZ vs Comb X-position on table

DY vs Comb X-position on table

-50 -40 -30 -20 -10 0 10 20 30 40 50

0 1 2 3 4 5

-50 -40 -30 -20 -10 0 10 20 30 40 50

0 1 2 3 4 5