Balmonitor 01/02/2002 Reference side

DZ

North South

0deg CP 180deg CP

Non-Reference side

DY

-30 -20 -10 0 10 20 30

-2 0 2

-30 -20 -10 0 10 20 30

-2 0 2

-30 -20 -10 0 10 20 30

-2 0 2 -30 -20 -10 0 10 20 30

-2 0 2