1 Introduction

Frank

• -Performance Muon system in ATLAS—¿ need 20um • -Discuss High Mechanical precision in context existing muon chambers. • -Refer to exisitng notes/papers on ATLAS MDTs (Marcel) • -Desctiption Muon System in Atlas: Magnet, MDT, RASNIK • -Description MDT(tubes,spacer,alignment) Plot-of-MDT • -Discuss contents paper

2 Drift Tube Construction

Frank

• -Describe drift tube Plot-of-drift-tube • -Wiring robot • -Wire Position Plot-of-Position (Marcel) • -Wire Tens Plot-of-Tension-distribution (Marcel) • -TUBe HV (Harry) Plot-of-HV-dist (Harry) • -Gasleak Plot-of-GasLeak (Marcel?)

3 Spacer

??? ???

4 Assembly Station

• -jigging+mechanics intrinsic precision (Marcel) • -alignment jigging+mechanics (Marcel) Plot-Assembly-Station

4.1 Gluing/Assembly • -sagcompensation (Marcel) • -GuidoLAser (Graziano) Plot-with-Results (include tomo) • -Glue machine ??? • -Production time ???

• -monitoring RASNIKS + Forces + Pressures (Graziano)

4.1.1 Results Monitoring Graziano Plot-Steps-RASASS

5 Xray tomograph

Marcel

• -Intro tomo–¿ reference • -Results Tomo • -Comparison Results Tomo+Monitoring (Graziano) Z+Y-Plot-of-RASNIKvsTOMO • -Mention Cosmic Ray Stand

6 Conclusions