wire position Z [mm]

-30 -20 -10 0 10 20 30 wire position Y [mm]

-30

-20

-10

0

10

20

30 h_yz Mean x 0.5785 Mean y 0.09266 RMS x 6.698 RMS y 6.943 Integral 4169 h_yz