50 100 150 200 250 300 350 400

-0.2

-0.15

-0.1

-0.05 -0 0.05 0.1 0.15

0.2_{ML1 ML2}

0

0

-4.78e-05

Z-Position BOL002

50 100 150 200 250 300 350 400

-0.6

-0.4

-0.2

0

0.2

0.4

0.6_{ML1 ML2}

0

0

-0.0034

Y-Position BOL002

0 2 4 6 8 10 12 14

-0.01

-0.005

0

0.005

0.01

Radius Residu BOL002