Mean 1.565e-09 RMS 3.379e-09 Integral 3.758e+04

leak rate [bar l/s] -9 10^{-8}10^{-7}10 0

5000

10000

15000

20000

25000

30000 h_leak Mean 1.565e-09 h_leak