dark current (final) [nA]

0 0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 0 200 400 600 800 1000

1200

1400

1600

1800

2000 h_hv5 Mean 2.017

RMS 0.4527 Integral 3.758e+04

h_hv5