RASNIK vs 3D for large distances

0 10 20 30 40 50 60

0 10 20 30 40 50 60 Y 3D (mm)

Y RASNIK (mm)

-2 -1.5 -1 -0.5 0 0.5 1 1.5 2

0 10 20 30 40 50 60 Y 3D (mm)

Difference (um)