\documentclass[11pt]{article}
\usepackage{a4}
\usepackage{times}
\begin{document}


\section{Introduction} Frank
\begin{itemize}
\item -Performance Muon system in ATLAS---> need 20um 
\item -Discuss High Mechanical precision in context existing muon chambers.
\item -Refer to exisitng notes/papers on ATLAS MDTs (Marcel)
\item -Desctiption Muon System in Atlas: Magnet, MDT, RASNIK
\item -Description MDT(tubes,spacer,alignment) Plot-of-MDT
\item -Discuss contents paper
\end{itemize}

\section{Drift Tube Construction} Frank
\begin{itemize}
\item -Describe drift tube      Plot-of-drift-tube
\item -Wiring robot 
\item -Wire Position Plot-of-Position (Marcel)
\item -Wire Tens    Plot-of-Tension-distribution (Marcel)
\item -TUBe HV (Harry)  Plot-of-HV-dist (Harry)     
\item -Gasleak  Plot-of-GasLeak   (Marcel?)
\end{itemize}

\section{Spacer} ???
???

\section{Assembly Station}
\begin{itemize}
\item -jigging+mechanics intrinsic precision (Marcel)
\item -alignment jigging+mechanics  (Marcel)  Plot-Assembly-Station
\subsection{Gluing/Assembly}
\item -sagcompensation  (Marcel)
\item -GuidoLAser  (Graziano)  Plot-with-Results (include tomo)
\item -Glue machine ???
\item -Production time ???
\item -monitoring RASNIKS + Forces + Pressures  (Graziano)
\end{itemize}
\subsubsection{Results Monitoring} Graziano   Plot-Steps-RASASS

\section{Xray tomograph} Marcel
\begin{itemize}
\item -Intro tomo--> reference
\item -Results Tomo
\item -Comparison Results Tomo+Monitoring (Graziano)  Z+Y-Plot-of-RASNIKvsTOMO
\item -Mention Cosmic Ray Stand
\end{itemize}

\section{Conclusions} 
\end{document}

