20010126(v6) RASNIK and Temp vs Time

0

0.02

0 20

Δ=0-6 μm

Xras(mm)

2.75 2.8 2.85

0 20

Yras(mm)

0 0.1 0.2

0 20

Zras (mm)

-0.2 0 0.2

0 20 rotZ (mrad)

0 20 40

0 20

time

ΔTemperature

0

0.02

0 20

Δ=6-10 μm

2.75 2.8 2.85

0 20

Yras(mm)

0 0.1 0.2

0 20

Zras (mm)

-0.2 0 0.2

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature

0

0.02

0 20

Δ=10+ μm

2.75 2.8 2.85

0 20

Yras(mm)

0 0.1 0.2

0 20

Zras (mm)

-0.2 0 0.2

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature

0

0.02

0 20

2.75 2.8 2.85

0 20

Yras(mm)

0 0.1 0.2

0 20

Zras (mm)

-0.2 0 0.2

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature

20010126(v6) RASNIK and Temp vs Time

-0.15

-0.1

0 20

Δ=0-6 μm

Xras(mm)

-0.002 0 0.002

0 20

Yras(mm)

-0.02 0

0 20

Zras (mm)

-0.5 0

0 20 rotZ (mrad)

0 20 40

0 20

time

ΔTemperature

-0.15

-0.1

0 20

Δ=6-10 μm

-0.002 0 0.002

0 20

Yras(mm)

-0.02 0

0 20

Zras (mm)

-0.5 0

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature

-0.15

-0.1

0 20

Δ=10+ μm

-0.002 0 0.002

0 20

Yras(mm)

-0.02 0

0 20

Zras (mm)

-0.5 0

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature

-0.15

-0.1

0 20

-0.002 0 0.002

0 20

Yras(mm)

-0.02 0

0 20

Zras (mm)

-0.5 0

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature

20010126(v6) RASNIK and Temp vs Time

0.054

0.055

0 20

Δ=0-6 μm

Xras(mm)

-0.25

-0.2

-0.15 x 10^{-2}

0 20

Yras(mm)

0

0.01

0 20

Zras (mm)

-1.8

-1.75

-1.7

0 20 rotZ (mrad)

0 20 40

0 20

time

ΔTemperature

0.054

0.055

0 20

Δ=6-10 μm

-0.25

-0.2

-0.15 x 10^{-2}

0 20

Yras(mm)

0

0.01

0 20

Zras (mm)

-1.8

-1.75

-1.7

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature

0.054

0.055

0 20

Δ=10+ μm

-0.25

-0.2

-0.15 x 10^{-2}

0 20

Yras(mm)

0

0.01

0 20

Zras (mm)

-1.8

-1.75

-1.7

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature

0.054

0.055

0 20

-0.25

-0.2

-0.15 x 10^{-2}

0 20

Yras(mm)

0

0.01

0 20

Zras (mm)

-1.8

-1.75

-1.7

0 20 rotZ (mrad)

0 20 40

0 20 time

ΔTemperature