0 2 4 6 8 10 12 14 16 18

6.66 6.67 6.68 6.69 6.7 6.71 6.72 G (10^{-11} m^3/kg/s^2)

-0.5 0 0.5 1 1.5 2 2.5 3 3.5

6.674 6.675 6.676