0 5 10 15 20 25 30 35 40

26 26.2 26.4 26.6 26.8 27 27.2 27.4 27.6 27.8 28

Entries Mean RMS 360 26.94 0.2154 21.85 / 17 Constant 29.05 Mean 26.93 Sigma 0.2476

Frequency (1/sec)