BOL1 and Mass Production at NIKHEF

a construction site for the ATLAS muon spectrometer

To general BOL page Specifications for BOL chambers

META DOCUMENTATION

how to use the documentation

DOCUMENTATION ASSEMBLY STATION

Chamber Control Document Chamber Assembly Document

Space frame assembly procedure+checks Sag Compensation Manual RASNIK Check kale spacer RASNIK Calibratie met spacer Bol monitor metingen buis-opleg-procedure buis-vervang-procedure buis-oplegschema Guido Laser procedure Kamer Lijm procedure Wire Tension Measurement on table Spacer-Tape aanbreng procedure RASNIK Monitor program for experts

DOCUMENTATION DRIFT TUBES

Endplug Assembly and Control Wire Tension Measurement after assembly Wire Tesnsion Measurement on table

PLOTS and PICTURES

MONITOR (updated every hour): RASNIK and corresponding Temperature plots Temperature plots (detail)

MEASUREMENTS and SUCH

1 of 2 6/6/01 4:31 PM

BOL1 ASSEMBLY PAGE http://www.nikhef.nl/~h73/BOL1.html